Sheet Metal Grooving Machine

Manual Sheet Metal Grooving Machine for HVAC Duct Fabrication

The Manual Sheet Metal Grooving Machine is a reliable and cost-effective solution for producing reinforcement grooves and beads on sheet metal. Operated by a rotating hand crank, this machine allows controlled, accurate grooving without the need for electrical power, making it ideal for workshops, on-site jobs, and locations with limited electricity access.

Designed for durability and precision, this machine is widely used in HVAC duct manufacturing, ventilation duct production, and industrial sheet metal fabrication.

How It Works

The operator feeds the sheet metal between hardened grooving rollers and rotates the manual handle. The rollers form consistent grooves or beads across the sheet surface, improving strength and rigidity while maintaining clean finishing.

Applications

HVAC duct panel reinforcement

Ventilation duct fabrication

Sheet metal stiffening

GI sheet grooving

Aluminum and MS sheet forming

Small fabrication workshops